Michael Collins – Plaque – H204

Michael Collins – Plaque – HS204

Dimensions: Height: 26.5cm, Width: 19.5cm

Honor the legacy of Irish history with the Michael Collins – Plaque cast iron sign. Featuring the iconic image and name of Michael Collins, this high-quality cast iron plaque pays tribute to one of Ireland’s most influential historical figures. Crafted from durable cast iron, it ensures lasting strength and a timeless design. Perfect for homes, offices, or Irish-themed spaces, this plaque adds a touch of history and pride to any room.

Key Features:
Durable cast iron construction for lasting strength and quality
Iconic Michael Collins image and design
Ideal size for display in homes, offices, or Irish-themed decor
Adds a historic and patriotic touch to any room
A must-have for collectors of Irish history and memorabilia

Order today from Eurosalve and bring the legacy of Michael Collins into your space!

The post Michael Collins – Plaque – H204 appeared first on Kilkenny Architectural Salvage & Antiques.