Cead Mile Failte – Green – Rectangle – HS49

Cead Mile Failte – Green – Rectangle – HS49

Dimensions:
Width: 15.5cm
Height: 7cm

Welcome guests with timeless Irish charm using the Cead Mile Failte – Green – Rectangle sign. Made from durable cast iron, this classic piece adds a touch of heritage to any space.

Key Features:
Durable Cast Iron: Crafted for lasting quality with a sturdy, premium finish.
Elegant Design: Features the iconic “Cead Mile Failte” greeting in a vibrant green hue, symbolizing warm Irish hospitality.
Compact Size: Measuring 15.5cm x 7cm, it’s perfect for doorways, porches, or interior decor.
Easy Installation: Pre-drilled holes make hanging this sign simple and secure.
Perfect Gift: A thoughtful choice for lovers of Irish culture and tradition.

Celebrate the spirit of a hundred thousand welcomes with this beautiful and versatile sign. Order today from EuroSalve – bring Irish hospitality to your home!

The post Cead Mile Failte – Green – Rectangle – HS49 appeared first on Kilkenny Architectural Salvage & Antiques.