Slainte – Narrow – Small – HS339

Slainte – Narrow – Small – HS339

Dimensions: Width: 25.5cm, Height: 4cm

Celebrate Irish heritage with the Slainte – Narrow – Small cast iron sign. Featuring a sleek and compact design, this sign embodies the timeless Irish toast to health and well-being. Made from durable cast iron, it offers a rustic charm while ensuring long-lasting quality. Perfect for kitchens, bars, or cozy nooks, this decorative piece adds a touch of culture and authenticity to any space.

Key Features:
Durable cast iron construction
Sleek, narrow design for compact spaces
Classic Irish toast for health and well-being
Rustic charm with long-lasting quality
Ideal for kitchens, bars, or cozy nooks

Order today from Eurosalve and bring a touch of Irish tradition into your home!

The post Slainte – Narrow – Small – HS339 appeared first on Kilkenny Architectural Salvage & Antiques.