Road Sign – Cead Mile Failte – Small – HS322

Road Sign – Cead Mile Failte – Small – HS322

Dimensions: 17.5cm x 5cm

Welcome guests with Irish charm using the Road Sign – Cead Mile Failte – Small. This compact cast iron sign features the traditional Gaelic greeting “Cead Mile Failte” (a hundred thousand welcomes), making it a perfect addition to any home or space that values warmth and heritage.

Key Features:
Traditional Irish Greeting: Displays the phrase “Cead Mile Failte,” embodying Irish hospitality and culture.
Durable Cast Iron: Made from high-quality cast iron for a rustic and enduring finish.
Compact Design: Perfect size for small spaces, doorways, or as part of a gallery wall.
Versatile Placement: Suitable for entryways, living rooms, or anywhere a warm welcome is needed.
Easy to Mount: Comes with pre-drilled holes for effortless installation.

Order today from EuroSalve—bring a touch of Irish heritage and hospitality to your home!

The post Road Sign – Cead Mile Failte – Small – HS322 appeared first on Kilkenny Architectural Salvage & Antiques.