Cead Mile Failte – Small – Rectangle – Italics – HS50

Cead Mile Failte – Small – Rectangle – Italics – HS50

Dimensions: Height: 5cm, Width: 17cm

Welcome guests with the timeless charm of the Cead Mile Failte – Small – Rectangle – Italics cast iron sign. Featuring the iconic Irish phrase “A Hundred Thousand Welcomes” in elegant italics, this compact rectangular sign is perfect for adding a touch of Irish hospitality to your home or space. Crafted from durable cast iron, it ensures lasting quality and rustic appeal. Ideal for doorways, entryways, or Irish-themed decor, this sign brings a warm and inviting touch wherever it’s displayed.

Key Features:
Durable cast iron construction for lasting strength and resilience
Iconic “Cead Mile Failte” phrase in elegant italics
Compact rectangular size ideal for doorways or small spaces
Adds a warm, welcoming touch to any decor
A must-have for Irish heritage enthusiasts and collectors

Order today from Eurosalve and bring the spirit of Irish hospitality into your home!

The post Cead Mile Failte – Small – Rectangle – Italics – HS50 appeared first on Kilkenny Architectural Salvage & Antiques.