Slainte – Medium – HS340

Slainte – Medium – HS340

Dimensions: Height: 5cm, Width: 17cm

Celebrate Irish tradition with the Slainte – Medium cast iron sign. Featuring the classic Irish toast to health, this sign brings a touch of warmth and culture to any space. Crafted from durable cast iron, it offers both lasting quality and a rustic charm, making it perfect for kitchens, bars, or living areas. Its medium size ensures it’s visible while still fitting comfortably into any décor, making it an ideal addition for anyone who loves Irish heritage.

Key Features:
Made from high-quality cast iron, offering durability and a long-lasting rustic finish.
Features the classic “Slainte” toast, symbolizing health and well-being in Irish tradition.
Medium size design that fits well in kitchens, bars, or living areas, enhancing your décor.
Simple yet elegant design that complements both modern and traditional interior styles.
Easy to hang with pre-drilled holes, providing convenient and secure mounting options.

Order today from Eurosalve and bring the spirit of Irish hospitality into your home!

The post Slainte – Medium – HS340 appeared first on Kilkenny Architectural Salvage & Antiques.