Failte Isteach – Welcome In – Small – HS82

Failte Isteach – Welcome In – Small – HS82

Dimensions: Width: 19.5cm, Height: 8cm

Add a warm Irish welcome to your space with the Failte Isteach – Welcome In – Small sign. Crafted with intricate detail and a charming design, this decorative piece is perfect for doorways, entry halls, or any area that could use a friendly touch. Made with high-quality materials, it’s both durable and lightweight, making it easy to hang or display. Bring a piece of Irish culture into your home with this timeless sign that embodies hospitality and warmth.

Key Features:
Compact size for versatile placement
High-quality, durable materials
Lightweight and easy to hang
Timeless design showcasing Irish culture
Perfect for doorways, halls, and entry spaces

Order today from Eurosalve and let your home exude a warm Irish welcome!

The post Failte Isteach – Welcome In – Small – HS82 appeared first on Kilkenny Architectural Salvage & Antiques.