Cead Mile Failte – Oval – Small – HS48

Cead Mile Failte – Oval – Small – HS48

Dimensions:
Option 1: Width: 17cm, Height: 9cm
Option 2: Width: 16cm, Height: 8cm

Embrace the warmth of Irish hospitality with the Cead Mile Failte – Oval – Small sign. Designed with timeless elegance, this cast iron piece is perfect for adding a touch of tradition to your home.

Key Features:
Premium Cast Iron: Sturdy and durable, ensuring lasting quality for indoor or outdoor use.
Elegant Oval Design: Features the classic “Cead Mile Failte” message in a versatile oval shape.
Two Size Options: Available in 17cm x 9cm or 16cm x 8cm, depending on stock levels, with either capital or smaller lettering.
Vibrant Finish: Adds a rich, traditional feel to your decor with a design that exudes Irish charm.
Simple to Install: Pre-drilled holes for easy and secure mounting.

Celebrate the essence of a hundred thousand welcomes with this beautifully crafted sign. Order today from EuroSalve – bring Irish warmth into your space!

The post Cead Mile Failte – Oval – Small – HS48 appeared first on Kilkenny Architectural Salvage & Antiques.