Cead Mile Failte Oval – Large – HS47

Céad Míle Fáilte Oval – Large Cast Iron Sign – HS47

Welcome guests in true Irish tradition with the Céad Míle Fáilte Oval – Large Cast Iron Sign. Measuring 26cm x 16cm, this beautifully crafted sign embodies the spirit of Irish hospitality with its timeless “One Hundred Thousand Welcomes” message. Its oval design and durable build make it a perfect addition to your home, garden, or business entrance.

Key Features:
Durable Cast Iron Material: Designed to withstand the elements, making it ideal for both indoor and outdoor use.
Authentic Irish Welcome Message: A classic and heartwarming way to greet visitors, showcasing Irish culture.
Elegant Oval Design: Large 26cm x 16cm size ensures it stands out while maintaining a refined look.
Simple Installation: Pre-drilled holes make mounting quick and easy.
Ideal Gift: Perfect for anyone who loves Irish heritage or unique decorative accents.

Order today from EuroSalve and extend a hundred thousand welcomes with this charming sign!

The post Cead Mile Failte Oval – Large – HS47 appeared first on Kilkenny Architectural Salvage & Antiques.